Hello World (Again)!

Hey there! I know it’s been a while since I’ve posted. Since my last post, the team and I decided to shut down SimpliFit, and I’m at Infuse.us! Though I’m sad that SimpliFit did not work out, I’m excited about the next stage in my career at Infuse. I’m also happy to say that in […]

The post Hello World (Again)! appeared first on Go Foryt Blog.